0 200 400 600 800 1000

1200

1400

1600

-2 -1 0 1 2 0 200 400 600 800 1000

1200

1400

1600

-2 -1 0 1 2

Efficiency Vs. η

η - all η - found

efficiency Vs. η 0.8 0.85 0.9 0.95 1 1.05 1.1

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2