0 1000

2000

3000

4000

5000

6000

7000

0 2 4 6 8 10 0 1000

2000

3000

4000

5000

6000

0 2 4 6 8 10

Efficiency Vs. Pt ID Entries Mean RMS

110 30646 2.137 2.012

Pt - all

ID Entries Mean RMS

111 29715 2.145 2.014

Pt - found

efficiency Vs. Pt 0.8 0.85 0.9 0.95 1 1.05 1.1

0 1 2 3 4 5 6 7 8 9 10