Figure 2.8: The parameter space covered by FINeSSE+MiniBooNE for ν_μ disappearance (labeled “FINESE”). Also shown: allowed regions in 3+1 models given the LSND signal (solid), existing exclusion regions from CDHS and CCFR, and the expected exclusion region for MiniBooNE.